<a class="comment_auth" href="https://www.carbonwind.net/blog/post/You-may-receive-warnings-while-accessing-secure-web-sites-with-Opera-and-Safari-on-Windows-behind-Forefront-TMG-2010-RTM-doing-Outbound-HTTPS-Inspection.aspx" alt="https://www.carbonwind.net/blog/post/You-may-receive-warnings-while-accessing-secure-web-sites-with-Opera-and-Safari-on-Windows-behind-Forefront-TMG-2010-RTM-doing-Outbound-HTTPS-Inspection.aspx" title="https://www.carbonwind.net/blog/post/You-may-receive-warnings-while-accessing-secure-web-sites-with-Opera-and-Safari-on-Windows-behind-Forefront-TMG-2010-RTM-doing-Outbound-HTTPS-Inspection.aspx">Adrian Dimcev's Blog</a> on <a href="/blog/post/Quickly-probing-with-OpenSSL-for-the-status-of-a-certificate-using-OCSP#id_fa036a33-bf90-4a35-9299-4a9e45f4d9f5" alt="/blog/post/Quickly-probing-with-OpenSSL-for-the-status-of-a-certificate-using-OCSP#id_fa036a33-bf90-4a35-9299-4a9e45f4d9f5">Quickly probing with OpenSSL for the status of a certificate using OCSP</a>

You may receive warnings while accessing secure web sites with Opera and Safari on Windows behind Forefront TMG 2010 RTM doing Outbound HTTPS Inspection

You may receive warnings while accessing secure web sites with Opera and Safari on Windows behind Forefront TMG 2010 RTM doing Outbound HTTPS Inspection